GMT Jul 25 14:57 ./PSREG/regRST5-7.11.ps by T. OKI

-3.0-2.5-2.0-1.5-1.0-0.50.00.51.01.52.02.53.0

Normalized Index

1950 1955 1960 1965 1970 1975 1980 1985 1990

Year

Interannual Variation in Thailand

Rain : 5-7 SOI : 11

r = 0.4267