75˚ 80˚ 85˚ 90˚ 95˚ 100˚ 105˚ 110˚ 115˚ 120˚ 125˚ -5˚

0˚

5˚

10˚

15˚

20˚

25˚ GAME-Tropics Flux Observation Sites